-- ============================================
-- 로그인 실패 잠금 컬럼 추가 (P2-21)
-- ============================================

ALTER TABLE `member`
  ADD COLUMN `mb_login_fail_count` INT UNSIGNED NOT NULL DEFAULT 0 COMMENT '연속 로그인 실패 횟수' AFTER `mb_leavedate`,
  ADD COLUMN `mb_locked_until` DATETIME NULL DEFAULT NULL COMMENT '잠금 해제 시각' AFTER `mb_login_fail_count`;
